%\documentstyle[simplemargins,10pt,resume]{article}
%\settopmargin{.75in}
\documentclass{res}
\usepackage[margin=.75in]{geometry}

\begin{format}
\title{l}\employer{r}\\
\dates{r}\\
\body\\
\location{l}\\
\end{format}

\begin{document}
\begin{tabular}{l}
{\Large \textbf {Joseph T Foley}}\\
70 Amherst St.\\
Cambridge, MA 02142\\
\end{tabular}\hfill
\begin{tabular}{ll}
Home: &(617)225-6696 \\
Cell: &(617)233-4590\\
\texttt{Email:} &\texttt{foley@mit.edu}\\
\end{tabular}

\begin{resume}
\section{Professional} Mechanical Design, Manufacturing Design
and Process Control, Computer Automation, Distributed
System Design, Network Administration and Security, Database
Applications.

\section{Interests} Robotics, Network Protocols, Unix, High Speed
Networking, Network Security and Cryptography, Distributed File
Systems, Backup/High Availability Systems, Computer-CAM/Instrument
Interfaces, Digital Design, Home Automation, VLSI Design,
Very Large Databases.

\section{Education} \employer{\bf Massachusetts Institute of
Technology} \location{Cambridge, MA} Graduated in June of 1999 with a
Bachelors and Masters of Engineering in Computer Science and
Electrical Engineering with a minor in Mechanical Engineering.\\
Currently a PhD Research Assistant in Mechanical Engineering estimated
to complete in June 2006.

\title{Research Assistant}
\employer{\bf Massachusetts Institute of Technology} 
\dates{\it January 1998 - present}
\location{Cambridge, MA}

\section{Experience}
\begin{position}
Researcher for Professor Sanjay Sarma (Mechanical Engineering) as part of AutoID Center\\
Designed and Implemented Demonstrations of AutoID Technology in Cambridge, UK Exposition.\\
Currently doing research into Internet-enabled RFID Privacy and Security.
\end{position}

\title{Teaching Faculty}
\employer{\bf Harvard Extension School} \location{Cambridge, MA}
\dates{\it September 2005-January 2006} 
\begin{position}
Teaching Assistant for CSCI-E-170: Computer Security and Privacy.
\end{position}

\title{Consultant}
\employer{\bf Insight Technologies} \location{Londonderry, NH}
\dates{\it February 2000 - June 2001}
\begin{position}
Consulted on Manufacturing M3/M5 Tactical Illuminator as Part
of Graduate Manufacturing Course (2.810).
\end{position}

\title{Software Developer and Network Administrator}
\employer{\bf Emode, Inc.} \location{Cambridge, MA}
\dates{\it May 2000 - Sept 2000}
\begin{position}
Software Developer and Network Administrator.\\
Developed World's Largest Fully-Indexed Quote Database.\\
Developed and Installed Network Security Policies and Equipment.
\end{position}

\title{Mechanical Design}
\employer{\bf Brute Force Games}\location{Cambridge, MA}
\dates{\it May 1997 - September 1997}
\begin{position}
Designed full immersion game simulator platform leveraging vection research.
\end{position}

\employer{\bf Massachusetts Institute of Technology} \location{Cambridge, MA}
\dates{\it September 1996 - September 2000}
\begin{position}
Residential Computing Consultant (Information Systems).\\
MIT Network Operations Employee (Information Systems).\\
MIT Network Security Employee (Information Systems).\\
Redesigned Undergraduate Design Course(2.007) under Professor Alex Slocum (Mech E).\\
6.004 (Computation Structures) Lab Assistant (MIT EECS Department).
\end{position}

%\employer{\bf Massachusetts Institute of Technology} \location{Cambridge, MA}
%\dates{\it January 1996 - May 1997}
%6.004 (Computation Structures) Lab Assistant (MIT EECS Department)

%\employer{\bf Massachusetts Institute of Technology} \location{Cambridge, MA}
%\dates{\it September 1995 - August 1996}
%The Invention Group under Alex Slocum (Mech E)0
%
\title{Network and Computer Administrator}
\employer{\bf Brooks Automation} \location{Lowell, MA}
\dates{\it March 1994 - August 1995}
\begin{position}
Network Installation: Analysis, Design, Upgrading/Installing.\\
Computer Equipment Service: Software and Hardware Repair/Administration/Migration.
\end{position}

\title{Hardware Interface Programmer}
\employer{\bf University of Massachusetts, Lowell} \location{Lowell,
MA} \dates{\it October 1993 - February 1994} 
\begin{position}
Programming using the HP-GPIB interface to network the Solar Cell Research Lab's
instruments (microammeter, multimeter, etc.).  This was used
to collect, organize and analyze cell data.
\end{position}

%\sectiontitle{Background} High school: Saludatorian, 1994, Salem High
%School, Salem, NH.; also chosen as Rensselaer Medalist, Bausch and
%Lomb Scholar, Tandy Technology Scholar, and Admiral C. Byrd
%Scholarship winner.  Director of Publicity for MIT's Lecture Series
%Committee.

\parskip = 0pt
\section{Skills}
{\em Computer languages:} C(++), Perl, Java, XML, lexx, SCHEME, SQL, PICASM\\
{\em UN\_X/Media development tools:} HTML/CGI, \LaTeX, PostScript, sh, CVS/Subversion, Kerberos\\
%Certified for IPC Class 2 Soldering\\
{\em Mech E Tools:} Matlab, Maple, ProEngineer, SolidWorks, Abacus, CNC Machining\\
{\em Digital System Design:} Logic Analyzer, Serial Protocol Analyzer, Controller Simulators
%Instruments: Oscilloscopes, Multimeters, Digital Analyzers, Serial-line Analyzers, Signal Generators
%and Inductive Receivers.
\end{resume}
\end{document}
